50 women rushed to hospital due to gas leak in SEZ near Visakhapatnam

On Tuesday, 2 August 2022, a gas leak was reported at the Brandix Apparel unit in the Atchuthapuram Special Economic Zone (SEZ) near Visakhapatnam District. Around 50 women have reportedly been admitted to the hospital as they complained of nausea and vomiting sensations. According to sources, the women were administered first aid at the medical […]