30 affected in gas leak at Atchuthapuram SEZ of Visakhapatnam District

A few hours ago, a major gas leak occurred at the Atchuthapuram Special Economic Zone (SEZ) of Visakhapatnam District. As per preliminary reports, nearly 30 workers have fallen unconscious due to an ammonia leak from Porus Laboratories this afternoon. The affected workers were immediately shifted to nearby hospitals at Anakapalli and Yelamanchali. A total of […]