1 year since the deadly gas leak that happened at LG Polymers, Vizag

7 May 2020, will go down as a dark day in the history of Visakhapatnam. What seemed a regular morning out of the dew, turned smoggy. It didn’t take long for a self-embedded city to turn into a point of national interest. While it has been a year since this fatal day, the terrible memories […]