Fact check on viral news claiming 6 injured in a gas leak in Ferro Alloys plant in Vizag

The Assistant Development Commissioner of Visakhapatnam Special Economic Zone (VSEZ), Ramalinga Reddy, slashed rumours of a gas leak at the Abhijeet Ferro Alloys plant in Atchutapuram, Vizag. He said that the news in the national media is misleading and there was no gas leak in the plant. The plant is functioning as usual. The national […]