YS Jagan orders safety audit in all industries of AP in view of recent gas leak incident near Visakhapatnam

In wake of the recent gas leak incident in Brandix Apparel near Visakhapatnam, Andhra Pradesh Chief Minister YS Jagan Mohan Reddy has ordered a safety audit in all industries in the state on Wednesday.   The decision came after the gas leak incident that took place at the Atchuthapuram SEZ of Anakapalli District, near Visakhapatnam […]