Vizag gas leak: Andhra High Court grants bail to 12 accused, including LG Polymers CEO

Twelve people accused in the RR Venkatapuram LG Polymers gas leak mishap were arrested earlier in July this year. The Andhra Pradesh High Court, on Tuesday, granted bail to all the accused who were taken into custody in connection with the LG Polymers gas leak in Vizag. The LG Polymers’ Managing Director and CEO Sunkey […]