A minor gas leak at HPCL in Vizag; no casualties reported so far

A major accident was averted as a minor gas leak occurred at Hindustan Petroleum Corporation Limited (HPCL) in Visakhapatnam on Wednesday. The incident happened at the Crude Oil Distillation Unit-2 (CDU).  Soon after the gas leak, a siren was sounded alerting the workers who ran out of the unit immediately. The technical team of HPCL […]