LG Polymers announces ex-gratia for victims of Visakhapatnam Gas Leak that left 12 dead, 800 injured in 2020

LG Polymers India Ltd, the Indian arm of South Korea’s LG Chemical, has announced a Rs 60 crore ex-gratia payment to support families most affected by the devastating gas leak at its chemical plant in Visakhapatnam on 7 May 2020. The tragedy claimed the lives of 12 people and left over 800 injured. The compensation […]