LG Polymers CEO, 11 others arrested over fatal gas leak in Visakhapatnam

The High Power Committee formed to probe into the Styrene gas leak mishap in LG Polymers plant, RR Venkatapuram submitted its findings on Monday to the AP Chief Minister YS Jagan Mohan Reddy two months after the incident. In the latest, the Visakhapatnam Police on Tuesday arrested LG Polymers CEO and eleven others in connection […]