Pharma company’s negligence resulted in Vizag gas leak, reports committee

The leakage of benzimidazole vapours at the Sainor Life Sciences pharma company at Jawaharlal Nehru Pharma City in Vizag, on 29 June 2020, had caused fatal consequences. While two of the employees lost their lives, four individuals fell sick after inhaling the gas and were rushed to a hospital for treatment. In wake of the […]