Steve Smith and David Warner banned for a year, to miss IPL 2018

Australian superstars Steve Smith and David Warner have been handed over one-year bans by Cricket Australia. The duo will also not be eligible to lead the national team until the next two years according to a sanction. Opener Cameron Bancroft, on the other hand, has been slapped with a ban of nine months. Indian Premier […]