David Warner steps down as Sunrisers Hyderabad Captain

In a recent announcement, Sunrisers Hyderabad has confirmed that David Warner has stepped down as the captain of the franchise in the upcoming edition of IPL. The new captain of the franchise is yet to be announced. “In light of recent events, David Warner has stepped down as captain of SunRisers Hyderabad. The new captain […]